##base _quantizerBase
##bias 30
* The quantizer interface
##public
InitQuantizer(struct Window *window, ULONG mode, ULONG numcolours, ULONG firstcolour)(a0/d0/d1/d2)
DeleteQuantizer(void)()
ResizeQuantizer(int width, int height)(d0/d1)
Quantize(APTR buffer)(a0)
##end
